#!/usr/bin/perl5
#
# ftp-config.hlp
#
# Copyright 1988-1996 Silicon Graphics, Inc.
# All rights reserved.
#
# This is UNPUBLISHED PROPRIETARY SOURCE CODE of Silicon Graphics, Inc.;
# the contents of this file may not be disclosed to third parties, copied or
# duplicated in any form, in whole or in part, without the prior written
# permission of Silicon Graphics, Inc.
#
# RESTRICTED RIGHTS LEGEND:
# Use, duplication or disclosure by the Government is subject to restrictions
# as set forth in subdivision (c)(1)(ii) of the Rights in Technical Data
# and Computer Software clause at DFARS 252.227-7013, and/or in similar or
# successor clauses in the FAR, DOD or NASA FAR Supplement. Unpublished -
# rights reserved under the Copyright Laws of the United States.
#
# $Id: ftp-config.hlp,v 1.5 1997/04/17 21:29:08 shotes Exp $

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Configuring the FTP Daemon</H2>
<P>
The FTP daemon, <VAR>ftpd</VAR>, listens for incoming connection
requests and assigns user privileges for FTP sessions. After a
session is underway, <VAR>ftpd</VAR> responds to requests that are
conveyed in user commands. When logging is enabled, <VAR>ftpd</VAR>
posts messages about session events to the server console and records
them in the system log.
</P>
<P>
Use the Configure FTP Daemon form to set these <VAR>ftpd</VAR> parameters:
</P>
<P>
<STRONG>Enable FTP:</STRONG> This selection determines whether the FTP
daemon will run and respond to requests. Select <VAR>Yes</VAR> to
turn the FTP daemon on, and <VAR>No</VAR> to turn the daemon off.
</P>
(Default value: Yes)
<P>
<STRONG>Idle time before connection is dropped (seconds):</STRONG>
The 900 seconds default allows a 15-minute interval of idle time on an
FTP connection before the connection is closed. To increase or decrease
the idle time, enter a new time in seconds.
</P>
(Default value: 900 seconds)
<P>
<STRONG>Log events in FTP sessions:</STRONG> This selection directs the 
FTP daemon to record FTP session events on the console and the system log. 
Select <VAR>Yes</VAR> (the default) to enable logging or <VAR>No</VAR> to
disable it.
</P>
(Default value: Yes)
<P>
<STRONG>Permission settings for new files:</STRONG> The default
permissions on user-created files in FTP-accessible directories are set
to read, write, and execute for the owner (ftp) and to read for the ftp
group and others. You can reset these defaults if you wish.
</P>
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
